DIGOUT(chan,expr);           Outputs to digital output channel

Procedure that sets bits in digital output channel 'chan' corresponding
to the binary representation of the value of 'expr' (represented as a
16 bit integer).  Only works if you have a digital output board that
DAN supports.
